%% test PlaTeX dla CP1250 (Win) i font/ow Type1
%% szczeg/o/ly w dokumentacji pakietu PL-QX
%% StaW, sierpie/n 1998
\documentclass[11pt]{article}
\usepackage{polski}
\usepackage[cp1250]{inputenc}
%\usepackage{qtimes} % np. dla calego dokumentu

\begin{document}

Test strony kodowej CP1250:

font PL: ąćęłńóśźż ĄĆĘŁŃÓŚŹŻ

\fontfamily{antt}\selectfont
font Antykwa: ąćęłńóśźż ĄĆĘŁŃÓŚŹŻ

\fontfamily{qpl}\selectfont
font Quasi Palladio: ąćęłńóśźż ĄĆĘŁŃÓŚŹŻ

\fontfamily{qtm}\selectfont
font Quasi Times: ąćęłńóśźż ĄĆĘŁŃÓŚŹŻ

\end{document}

